; module-definition file for tooldemo -- used by LINK.EXE

NAME       tooldemo            ; application's module name

DESCRIPTION  'ToolDemo Application'

EXETYPE      WINDOWS           ; required for all Windows applications

STUB       'WINSTUB.EXE'       ; Generates error message if application
                               ; is run without Windows

;CODE can be moved in memory and discarded/reloaded
CODE  PRELOAD MOVEABLE DISCARDABLE

;DATA must be MULTIPLE if program can be invoked more than once
DATA  PRELOAD MOVEABLE MULTIPLE


HEAPSIZE     1024
STACKSIZE    5120              ; recommended minimum for Windows applications


; All functions that will be called by any Windows routine
; MUST be exported.

EXPORTS
   MainWndProc
